1 10 100 1000 0.

0.500

1.00

1.50

2.00

2.50

3.00

P_{zz}/(ε-1)V normalized cylinder length (l/a)

Rayliegh (ε=2.0) M.M. model (ε=2.0) Rayliegh (ε=5.0) M.M. model (ε=5.0) Rayliegh (ε=10.0) M.M. model (ε=10.0) m ~gre